80˚W 70˚W 60˚W 50˚W 40˚W 30˚W 20˚W 0˚

10˚N

20˚N

30˚N

40˚N

50˚N

1000m

3000m

3000m

LOTUS Mooring Locations 70˚ 30'W 70˚ 00'W 69˚ 30'W

33˚ 30'N

34˚ 00'N

34˚ 30'N

WHOI Surface Subsurface Deep Moorings